0 200 400 600 800 1000

1200

1400

1600

1800

2000

-30 -20 -10 0 10 20 30 1

10

dT vs a N108

Histogram ID = 112

Prox.(dT vs a N108 CRP) 0 500 1000

1500

2000

2500

3000

-30 -20 -10 0 10 20 30 Histogram ID = 156