200 400 600 800 1000

1200

-10 0 10 1

10 ID 124 ENTRIES 10546 0.00 900. 0.00 0.00 0.846E+04 0.00 1.00 0.119E+04 2.00

dT vs a N110

Histogram ID = 124 200 400 600 800 1000

1200

-10 0 10 1

10 ID 127 ENTRIES 10546 0.00 0.307E+04 0.00 0.00 0.736E+04 0.00 3.00 114. 0.00

dT vs a N111 ONLY

Histogram ID = 127

200 400 600 800 1000

1200

-10 0 10 1

10 ID 130 ENTRIES 10546 0.00 964. 0.00 0.00 0.842E+04 0.00 0.00 0.113E+04 34.0

dT vs a N112 ONLY

Histogram ID = 130