D101 dT gated 0 1000

2000

3000

4000

5000

6000

7000

8000

-40 -20 0 20 40

ID Entries Mean RMS

111 730628 2.071 6.532

Histogram ID = 111 0 200 400 600 800 1000

1200

1400

1600

1800

2000

-20 0 20 1

10

10^2

ID 113 ENTRIES 1207746 0.00 0.514E+05 1.00 8.00 0.116E+07 11.0 0.00 0.00 0.00

dT vs A* N101

Histogram ID = 113

D108 dT gated 0 2000

4000

6000

8000

10000

-40 -20 0 20 40

ID Entries Mean RMS

112 866227 2.152 6.719

Histogram ID = 112 0 200 400 600 800 1000

1200

1400

1600

1800

2000

-20 0 20 1

10

10^2

ID 117 ENTRIES 1478574 0.00 0.499E+05 0.00 4.00 0.143E+07 2.00 0.00 0.00 0.00

dT vs A* N108

Histogram ID = 117