N115 A* 0 200 400 600 800 1000

1200

1400

1600

100 120 140 160 180 200

ID Entries Mean RMS

201 172366 87.65 35.74

0 200 400 600 800 1000

1200

1400

100 120 140 160 180 200

0.1978E+06/ 95 P1 854.7 0.4421 P2 120.3 0.4755E-02 P3 7.906 0.5476E-02 P4 5733. 4.256 P5 -64.64 0.5318E-01 P6 0.1836 0.1660E-03