-100

-50

0

50

100

150

200

250

20 40 60 1

10

10^2

10^3

Non-signal Analogue Up

-100

-50

0

50

100

150

200

250

300

20 40 60 1

10

10^2

10^3

Pedestal Subtracted Analogue Up