Energy loss NEUT101 0 500 1000

1500

2000

2500

0 10 20 30 40 50 60

183.1 / 44 P1 6301. 30.14 P2 23.41 0.1389E-01 P3 2.340 0.1533E-01

Energy loss NEUT102 0 500 1000

1500

2000

2500

0 10 20 30 40 50 60

200.0 / 44 P1 6284. 29.99 P2 23.41 0.1413E-01 P3 2.357 0.1558E-01